
    DESCRIPTION OF HANDICAP OPTIONS

    POINTS PER:
    ────────────────
 1.        RAW SCORE: Number of points penalty for a Wrong Guess;
                      This will always be half the number of points for
                      a Correct Guess.
                      e.g.> If 10 pts/raw score, then:
                            Correct Guess = +20 points
                              Wrong Guess = -10 points
                      (Default = 10 points)

 2. REMAINING SECOND: Number of points for each remaining second given to a
                      player after pressing his/her Player Key and answering
                      correctly.
                      e.g.> If 1 pt./remaining second and 5 seconds allowed:
                            If a player uses 2 seconds to answer correctly,
                            he/she accumulates 3 bonus points (5 - 2 = 3).
                      (Default = 1 point/remaining second)

 3.     NOTE PENALTY: The Number of points penalty per Note Differential,
                      which is the difference between the player's Total Notes
                      Used for all correct guesses and what SHOULD have been
                      used, if he/she was the MOST EFFICIENT GUESSER;
                      The lowest Notes/Correct Guess Average is used in this
                      calculation, if this option is turned on.
                      (Default = .5 point)

 4. PLAYER LAG: Number of seconds player has to answer after pressing his/her
                Player Key.
                (Default = 5 seconds)
                (Note: This option affects the Time Bonus, if in effect)
